{\small \tt
\begin{verbatim}
/*
 * $Header: /home/gene/library/website/docsrc/sca/src/RCS/debug.h,v 1.3 2006/01/18 03:47:30 gene Exp $
 *
 *  Copyright (c) 2006 Gene Michael Stover.  All rights reserved.
 * 
 *  This program is free software; you can redistribute it and/or modify
 *  it under the terms of the GNU Lesser General Public License as
 *  published by the Free Software Foundation; either version 2 of the
 *  License, or (at your option) any later version.
 * 
 *  This program is distributed in the hope that it will be useful,
 *  but WITHOUT ANY WARRANTY; without even the implied warranty of
 *  MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
 *  GNU Lesser General Public License for more details.
 * 
 *  You should have received a copy of the GNU Lesser General Public
 *  License along with this program; if not, write to the Free Software
 *  Foundation, Inc., 51 Franklin St, Fifth Floor, Boston, MA  02110-1301
 *  USA
 */

#if __cplusplus
extern "C" {
#endif

  /*
   * SOME DEBUGGING STOOF
   */
#define Trace(moo) DEBUG_Print (__FILE__, __LINE__, moo)

  /*
   */
  Boolean DEBUG_IsVerbose (void);

  /*
   * Print the message if debugging Is Verbose.
   */
  void DEBUG_Print (char file[], int line, char fmt[], ...);

  /*
   * It's appropriate to call this function like this:
   * DEBUG_PrintLastError (__FILE__, __LINE__,
   *                       "name-of-function-which-caused-error");
   */
  void DEBUG_PrintLastError (char file[], int line, char moo[]);

#if __cplusplus
}
#endif

/* --- end of file --- */
\end{verbatim}
}
